// Copyright 2019-2022 The Khronos Group Inc.
//
// SPDX-License-Identifier: CC-BY-4.0

// Common Valid Usage
// Common to KHR trace rays commands

  * [[VUID-{refpage}-maxPipelineRayRecursionDepth-03679]]
    This command must: not cause a shader call instruction to be executed
    from a shader invocation with a <<ray-tracing-recursion-depth, recursion
    depth>> greater than the value of pname:maxPipelineRayRecursionDepth
    used to create the bound ray tracing pipeline
  * [[VUID-{refpage}-commandBuffer-03635]]
    pname:commandBuffer must: not be a protected command buffer

// Common Valid Usage
