// Copyright 2023 The Khronos Group Inc.
//
// SPDX-License-Identifier: CC-BY-4.0

include::{generated}/meta/{refprefix}VK_MSFT_layered_driver.adoc[]

=== Other Extension Metadata

*Last Modified Date*::
    2023-06-21
*IP Status*::
    No known IP claims.
*Contributors*::
  - Jesse Natalie, Microsoft

=== Description

This extension adds new physical device properties to allow applications and
the Vulkan ICD loader to understand when a physical device is implemented as
a layered driver on top of another underlying API.

include::{generated}/interfaces/VK_MSFT_layered_driver.adoc[]

=== Examples

None.

=== Version History

  * Revision 1, 2023-06-21 (Jesse Natalie)
  ** Initial revision
