--
-- Copyright 2024 The Android Open Source Project
--
-- Licensed under the Apache License, Version 2.0 (the "License");
-- you may not use this file except in compliance with the License.
-- You may obtain a copy of the License at
--
--     https://www.apache.org/licenses/LICENSE-2.0
--
-- Unless required by applicable law or agreed to in writing, software
-- distributed under the License is distributed on an "AS IS" BASIS,
-- WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
-- See the License for the specific language governing permissions and
-- limitations under the License.

INCLUDE PERFETTO MODULE counters.intervals;

-- Gets devfreq frequency counter based on device queried. These counters will
-- only be available if the "devfreq/devfreq_frequency" ftrace event is enabled.
CREATE PERFETTO FUNCTION _get_devfreq_counters(
    -- Devfreq name to query for.
    device_name STRING
)
RETURNS TABLE (
  -- Unique identifier for this counter.
  id LONG,
  -- Starting timestamp of the counter.
  ts TIMESTAMP,
  -- Duration in which counter is constant and frequency doesn't chamge.
  dur DURATION,
  -- Frequency in kHz of the device that corresponds to the counter.
  freq LONG
) AS
SELECT
  count_w_dur.id,
  count_w_dur.ts,
  count_w_dur.dur,
  cast_int!(count_w_dur.value) AS freq
FROM counter_leading_intervals!((
  SELECT c.*
  FROM counter c
  JOIN track t ON t.id = c.track_id
  WHERE t.type = 'linux_device_frequency'
    AND EXTRACT_ARG(t.dimension_arg_set_id, 'linux_device') GLOB $device_name
)) AS count_w_dur;

-- ARM DSU device frequency counters. This table will only be populated on
-- traces collected with "devfreq/devfreq_frequency" ftrace event enabled,
-- and from ARM devices with the DSU (DynamIQ Shared Unit) hardware.
CREATE PERFETTO TABLE linux_devfreq_dsu_counter (
  -- Unique identifier for this counter.
  id LONG,
  -- Starting timestamp of the counter.
  ts TIMESTAMP,
  -- Duration in which counter is constant and frequency doesn't chamge.
  dur DURATION,
  -- Frequency in kHz of the device that corresponds to the counter.
  dsu_freq LONG
) AS
SELECT
  id,
  ts,
  dur,
  freq AS dsu_freq
FROM _get_devfreq_counters("*devfreq_dsu");
